Erratum for “Experimental tests of lepton universality in tau decay”, Phys. Rev. D 55, 2559 (1997).

A. Anastassov, et al.

(CLEO Collaboration)

(July 28, 1998) The originally published correlation coefficients between measured branching ratios are incorrect. The corrected Table XII appears below.

Table XII. Correlation coefficients between branching fraction measurements. B_μ B_h B_μ/B_e B_h/B_e B_e 0.50 0.48 −0.42 −0.39 B_μ 0.50 0.58 0.08 B_h 0.07 0.63 B_μ/B_e 0.45